05101520253035404554.0

8:23:50.0

46.0

42.0

30.0

24:00.0

3:23:00.0

22:00.0

21:00.0

RA (J2000)

Dec (J2000)

OBSID 01001514000 / DATE-OBS 2020-10-24T02:57:40.3

UVOT Finding Chart