010203040506070809048.0

44.0

18:30:40.0

36.0

44:00.0

30.0

-6:45:00.0

46:00.0

47:00.0

RA (J2000)

Dec (J2000)

OBSID 01004219000 / DATE-OBS 2020-11-05T02:24:06.4

UVOT Finding Chart