051015202518:30:50.0

46.0

42.0

43:30.0

44:00.0

30.0

-6:45:00.0

46:00.0

RA (J2000)

Dec (J2000)

OBSID 01005428000 / DATE-OBS 2020-11-11T09:49:59.5

UVOT Finding Chart