051015202530354045505508.0

04.0

5:43:00.0

42:56.0

16:00.0

30.0

25:15:00.0

14:00.0

13:00.0

RA (J2000)

Dec (J2000)

OBSID 01006906000 / DATE-OBS 2020-11-16T23:14:00.9

UVOT Finding Chart