051015202538.0

34.0

14:52:30.0

30.0

41:00.0

26:40:00.0

39:30.0

RA (J2000)

Dec (J2000)

OBSID 01009679000 / DATE-OBS 2020-11-28T06:33:13.1

UVOT Finding Chart