0123456758.0

54.0

18:32:50.0

46.0

42.0

26:00.0

30.0

34:25:00.0

24:00.0

23:00.0

RA (J2000)

Dec (J2000)

OBSID 01014012000 / DATE-OBS 2020-12-21T18:46:54.0

UVOT Finding Chart