0246810121416182040.0

8:51:30.0

20.0

10.0

12:00.0

30.0

11:00.0

71:10:00.0

09:30.0

RA (J2000)

Dec (J2000)

OBSID 01014316000 / DATE-OBS 2020-12-23T18:03:43.9

UVOT Finding Chart