010203040506030.0

15:39:00.0

30.0

38:00.0

-84:10:00.0

11:00.0

12:00.0

RA (J2000)

Dec (J2000)

OBSID 01015615000 / DATE-OBS 2021-01-02T01:23:18.5

UVOT Finding Chart