01234567820.0

10.0

6:55:00.0

54:50.0

42:00.0

30.0

41:00.0

64:40:00.0

39:00.0

RA (J2000)

Dec (J2000)

OBSID 01015873000 / DATE-OBS 2021-01-04T11:32:08.2

UVOT Finding Chart