010203040506054.0

17:57:50.0

46.0

42.0

38.0

16:30.0

17:00.0

30.0

-46:18:00.0

19:00.0

RA (J2000)

Dec (J2000)

OBSID 01032024000 / DATE-OBS 2021-02-11T08:48:34.4

UVOT Finding Chart