0.0002

0.0004

0.0006

0.0008

0.001

0.0012

0.0014

0.0016

0.0018

18:30:40.0

36.0

32.0

42:30.0

43:00.0

30.0

-6:44:00.0

45:00.0

RA (J2000)

Dec (J2000)

OBSID 01033144000 / DATE-OBS 2021-02-17T08:16:36.9

UVOT Finding Chart