02468101214161840.0

30.0

6:30:20.0

10.0

44:00.0

68:43:00.0

42:00.0

41:30.0

RA (J2000)

Dec (J2000)

OBSID 01033264000 / DATE-OBS 2021-02-17T23:27:52.0

UVOT Finding Chart