051015202522.0

18.0

14.0

21:19:10.0

30.0

34:00.0

34:33:00.0

32:00.0

RA (J2000)

Dec (J2000)

OBSID 01035922000 / DATE-OBS 2021-03-05T19:08:28.3

UVOT Finding Chart