01020304050607040.0

5:47:30.0

20.0

10.0

28:30.0

29:00.0

30.0

-65:30:00.0

31:00.0

RA (J2000)

Dec (J2000)

OBSID 01044032000 / DATE-OBS 2021-04-19T06:56:24.5

UVOT Finding Chart