0.20.40.60.81.21.41.61.858.0

54.0

14:11:50.0

46.0

42.0

02:00.0

30.0

01:00.0

36:00:00.0

35:59:00.0

RA (J2000)

Dec (J2000)

OBSID 01044236000 / DATE-OBS 2021-04-19T23:33:29.4

UVOT Finding Chart