0102030405034.0

6:59:30.0

26.0

22.0

57:00.0

30.0

56:00.0

4:55:00.0

54:00.0

53:30.0

RA (J2000)

Dec (J2000)

OBSID 01044426000 / DATE-OBS 2021-04-21T00:29:33.6

UVOT Finding Chart