05101520253035404538.0

34.0

14:49:30.0

26.0

31:30.0

32:00.0

30.0

-30:33:00.0

34:00.0

RA (J2000)

Dec (J2000)

OBSID 01046782000 / DATE-OBS 2021-05-04T13:58:57.9

UVOT Finding Chart