012345612.0

08.0

04.0

13:37:00.0

30.0

14:30:00.0

29:00.0

28:00.0

27:30.0

RA (J2000)

Dec (J2000)

OBSID 01054627000 / DATE-OBS 2021-06-10T15:09:17.1

UVOT Finding Chart