0123456744.0

16:15:40.0

36.0

30.0

25:00.0

14:24:00.0

23:00.0

RA (J2000)

Dec (J2000)

OBSID 01054681000 / DATE-OBS 2021-06-10T19:56:58.4

UVOT Finding Chart