010203040506022.0

16.0

15:55:10.0

04.0

02:30.0

03:00.0

30.0

-54:04:00.0

05:00.0

RA (J2000)

Dec (J2000)

OBSID 01057131000 / DATE-OBS 2021-06-21T17:19:25.1

UVOT Finding Chart