42:00.0

41:00.0

16:40:00.0

40:00.0

45:00.0

-53:50:00.0

RA (J2000)

Dec (J2000)

OBSID 00106034000 / DATE-OBS 2005-02-13T22:13:18.4

UVOT Finding Chart