0102030405060708:07:00.0

56.0

52.0

06:48.0

51:00.0

30.0

52:00.0

-32:53:00.0

54:00.0

RA (J2000)

Dec (J2000)

OBSID 01061284000 / DATE-OBS 2021-07-23T14:48:17.5

UVOT Finding Chart