0123456732.0

28.0

24.0

14:21:20.0

09:00.0

30.0

-1:10:00.0

11:00.0

12:00.0

RA (J2000)

Dec (J2000)

OBSID 01061511000 / DATE-OBS 2021-07-25T03:52:03.4

UVOT Finding Chart