0204060801001201405:35:00.0

56.0

52.0

34:48.0

14:00.0

30.0

22:13:00.0

12:00.0

11:00.0

RA (J2000)

Dec (J2000)

OBSID 01064361000 / DATE-OBS 2021-08-07T17:53:35.8

UVOT Finding Chart