051015202512.0

06.0

9:34:00.0

22:00.0

30.0

23:00.0

-51:24:00.0

25:00.0

RA (J2000)

Dec (J2000)

OBSID 01064421000 / DATE-OBS 2021-08-07T23:00:36.3

UVOT Finding Chart