01020304050607056:30.0

9:55:00.0

53:30.0

-86:59:30.0

-87:00:00.0

30.0

01:00.0

02:00.0

03:00.0

RA (J2000)

Dec (J2000)

OBSID 01069169000 / DATE-OBS 2021-08-18T01:16:55.4

UVOT Finding Chart