010203040506070809013:56:40.0

30.0

33:00.0

-60:34:00.0

35:00.0

RA (J2000)

Dec (J2000)

OBSID 01071765000 / DATE-OBS 2021-09-03T13:59:48.9

UVOT Finding Chart