051015202530354040.0

13:56:30.0

20.0

28:30.0

29:00.0

30.0

-60:30:00.0

31:00.0

RA (J2000)

Dec (J2000)

OBSID 01071768000 / DATE-OBS 2021-09-03T14:07:31.4

UVOT Finding Chart