02468101238.0

34.0

10:49:30.0

26.0

30.0

32:00.0

31:00.0

31:30:00.0

29:30.0

RA (J2000)

Dec (J2000)

OBSID 01081113000 / DATE-OBS 2021-10-25T05:15:37.5

UVOT Finding Chart