0102030405038.0

34.0

9:58:30.0

26.0

19:30.0

-24:20:00.0

30.0

21:00.0

22:00.0

23:00.0

RA (J2000)

Dec (J2000)

OBSID 01088376000 / DATE-OBS 2021-12-07T21:08:00.4

UVOT Finding Chart