01234568:48:40.0

36.0

32.0

42:30.0

43:00.0

30.0

-2:44:00.0

45:00.0

RA (J2000)

Dec (J2000)

OBSID 01091101000 / DATE-OBS 2021-12-27T23:37:29.3

UVOT Finding Chart