012345658.0

54.0

12:47:50.0

46.0

42.0

43:00.0

30.0

44:00.0

-28:45:00.0

46:00.0

RA (J2000)

Dec (J2000)

OBSID 01093611000 / DATE-OBS 2022-01-17T20:10:19.0

UVOT Finding Chart