02040608010012038.0

34.0

16:20:30.0

49:00.0

30.0

-15:50:00.0

51:00.0

52:00.0

RA (J2000)

Dec (J2000)

OBSID 01093693000 / DATE-OBS 2022-01-18T12:09:04.8

UVOT Finding Chart