024681012141612.0

08.0

04.0

12:49:00.0

30.0

56:00.0

22:55:00.0

54:00.0

53:30.0

RA (J2000)

Dec (J2000)

OBSID 01093742000 / DATE-OBS 2022-01-18T18:25:23.7

UVOT Finding Chart