01020304050607056.0

20:05:50.0

44.0

38.0

30.0

24:00.0

49:23:00.0

22:00.0

21:30.0

RA (J2000)

Dec (J2000)

OBSID 01094950000 / DATE-OBS 2022-03-02T16:41:52.0

UVOT Finding Chart