024681012141618202214:33:00.0

50.0

32:40.0

19:00.0

30.0

61:18:00.0

17:00.0

16:30.0

RA (J2000)

Dec (J2000)

OBSID 01098132000 / DATE-OBS 2022-03-19T17:55:33.9

UVOT Finding Chart