02468101252:00.0

46:00.0

12:40:00.0

13:00.0

30.0

12:00.0

11:00.0

89:10:00.0

09:30.0

RA (J2000)

Dec (J2000)

OBSID 01101053000 / DATE-OBS 2022-04-03T20:44:56.8

UVOT Finding Chart