0510152025306:30:30.0

26.0

22.0

30.0

34:00.0

9:33:00.0

32:00.0

31:00.0

RA (J2000)

Dec (J2000)

OBSID 01104692000 / DATE-OBS 2022-04-30T14:08:20.3

UVOT Finding Chart