024681012141618202236.0

3:41:30.0

24.0

32:30.0

33:00.0

30.0

-47:34:00.0

35:00.0

RA (J2000)

Dec (J2000)

OBSID 01107050000 / DATE-OBS 2022-05-18T06:21:59.5

UVOT Finding Chart