05101520253035404510.0

2:36:00.0

35:50.0

30.0

14:00.0

55:13:00.0

12:00.0

11:30.0

RA (J2000)

Dec (J2000)

OBSID 01110821000 / DATE-OBS 2022-06-18T09:16:08.6

UVOT Finding Chart