0246810121416:10:00.0

54.0

09:48.0

30.0

55:26:00.0

25:00.0

24:30.0

RA (J2000)

Dec (J2000)

OBSID 01114034000 / DATE-OBS 2022-07-01T05:07:52.7

UVOT Finding Chart