024681012141608.0

04.0

17:28:00.0

42:00.0

30.0

41:00.0

24:40:00.0

RA (J2000)

Dec (J2000)

OBSID 01115766000 / DATE-OBS 2022-07-11T18:18:51.5

UVOT Finding Chart