38.0

34.0

16:59:30.0

26.0

34:30.0

35:00.0

30.0

-33:36:00.0

37:00.0

RA (J2000)

Dec (J2000)

OBSID 01116441000 / DATE-OBS 2022-07-15T22:26:54.5

UVOT Finding Chart