0510152046.0

13:45:40.0

34.0

28.0

01:00.0

30.0

-44:02:00.0

03:00.0

04:00.0

RA (J2000)

Dec (J2000)

OBSID 01121751000 / DATE-OBS 2022-08-26T12:00:54.4

UVOT Finding Chart