024681052.0

48.0

44.0

16:19:40.0

45:30.0

46:00.0

30.0

-15:47:00.0

48:00.0

RA (J2000)

Dec (J2000)

OBSID 01125350000 / DATE-OBS 2022-09-26T08:16:16.5

UVOT Finding Chart