05101520253035404504.0

16:20:00.0

56.0

19:52.0

01:00.0

30.0

02:00.0

-16:03:00.0

04:00.0

RA (J2000)

Dec (J2000)

OBSID 01125354000 / DATE-OBS 2022-09-26T09:37:40.9

UVOT Finding Chart