0510152025303540454:19:00.0

56.0

52.0

18:48.0

30.0

22:00.0

21:00.0

13:20:00.0

19:30.0

RA (J2000)

Dec (J2000)

OBSID 01125809000 / DATE-OBS 2022-09-30T11:15:21.6

UVOT Finding Chart