051015202530354008.0

04.0

19:13:00.0

12:56.0

30.0

47:00.0

19:46:00.0

45:00.0

44:30.0

RA (J2000)

Dec (J2000)

OBSID 01126853000 / DATE-OBS 2022-10-09T14:25:17.3

UVOT Finding Chart