0246810121416182054.0

2:35:50.0

46.0

42.0

36:30.0

37:00.0

30.0

-34:38:00.0

39:00.0

RA (J2000)

Dec (J2000)

OBSID 01129775000 / DATE-OBS 2022-10-16T23:41:31.4

UVOT Finding Chart