0.20.40.60.81.21.41.61.82.211:19:00.0

56.0

52.0

18:48.0

04:00.0

30.0

33:03:00.0

02:00.0

01:00.0

RA (J2000)

Dec (J2000)

OBSID 01131029000 / DATE-OBS 2022-10-24T13:03:04.3

UVOT Finding Chart